Features a very soft & slightly beveled edge  Designed for applying blush to the apples of the cheek  Can also be used with powder for medium coverage  Made of SigmaTech® Fibers, an exclusive selection of high performance synthetic fibers  Boasts technologically advanced filaments with specialized tips  Holds & delivers makeup products without any absorption into the bristles  The patented 3-ring brush ferrule is made with SigmaAlloyTM for durability & strength 