A protective & soothing facial moisturizer for sensitive skin  Non-comedogenic, non-sensitizing & high tolerance formula suitable even for babies  Formulated with Glycerin to hydrate skin for 48 hours  Infused with Vitamin B3 for an intensely soothing effect  Loaded with La Roche-Posay Thermal Water to calm & reduce skin irritation  Leaves skin comfortable & hydrated  Free of fragrance & alcohol  Tested under dermatological & ophthalmological control 