A soothing paraffin-free aromatic candle  Made with hand poured 100% natural wax for quality & purity  Delivers essential oil based scents of Pure Rose, Rose Geranium & Ylang Ylang  Helps nurture, comfort & soothe the soul  Burns for up to 50 hours  Caution: Burn on a heat resistant surface. Do not drop foreign matter or wick-trimmings into candle. Burn in an open area away from drafts. Keep candle burning within sight. Keep out of reach of children & pets 